SYMBA RDA

Symba RDA comes with single, dual and mesh coil configurations, brings more possibilities to playability and its flavors. The unique ceramic deck delivers more even heat and decent flavors to users.

Specifications

Material:   Stainless Steel
Size:          ∅25X23mm
Drip Tip:    810
Thread:     510

Package Contents

1 x Squonk Pin
1 X Univapo Symba RDA
1 X User Manual
1 X Wire coiling tool
1 X T Head Screwdriver
3 X Cotton Strip
1 X MESH U1 0.3ohm
2 X Normal U2 0.5ohm